## Configuration file reference

This configuration file reflect the latest developments on the `main` branch. To check the configuration from a specific Continuwuity version, browse the [tags](https://forgejo.ellis.link/continuwuation/continuwuity/tags) and navigate to the `conduwuit-example.toml` file for that version.

---

```toml file="../../conduwuit-example.toml"

```
